SYNRAD3D: CHESS e- beam. L3 vacuum chamber updated Feb/14. RFA 49E1

X(cm)

Y(cm)

Entries 4578

Arrival S Position (m)

Azimuthal angle (degs) Origin S Position (m)

-5 -4 -3 -2 -1 0 1 2 3 4 5

-4 -2 0 2 4 0 20 40 60 80 100 120 140

387.9 388 388.1 388.2

0 100 200 300 400 500

0 100 200 300 400 0 100 200 300 400 500 600 700 800

390 400 410 420 430

SYNRAD3D: CHESS e- beam. L3 vacuum chamber updated Feb/14. RFA 49E1

Entries Mean RMS 4491

263.1 473.7

Arrival Energy (eV)

Entries Mean RMS 4441 4.802 3.677

Number of Reflections

Number of Reflections

Arrival Energy (eV)

Entries Mean RMS 4578 2.924 2.398

Difference Track Length and Del S (cm)

0 500 1000

1500

2000

2500

0 1000 2000 3000 0 200 400 600 800 1000

0 5 10 15 20

0 500 1000

1500

2000

2500

3000

3500

0 5 10 15 20 0 100 200 300 400 500

0 5 10 15

SYNRAD3D: CHESS e- beam. L3 vacuum chamber updated Feb/14. RFA 49E1

Number of Reflections

Origin S Position (m)

0 2 4 6 8 10

390 395 400 405 410 415 420 425 430 0 100 200 300 400 500 600