Vacuum chamber comparison: 5.3 GeV e+ 3 mA/bunch 15W

11/10/26 11.16

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

SR dose: 4.53Ξ10^{20}γ /m

9/27/11 SPU signal

SR dose: 1.37Ξ10^{23}γ /m

9/30/11 SPU signal

SR dose: 4.45Ξ10^{23}γ /m

10/4/11 SPU signal

SR dose: 2.91Ξ10^{24}γ /m

10/25/11 SPU signal

SR dose: 2.91Ξ10^{24}γ /m

10/25/11 SPU signal