ECLOUD L3-1_posinst: Electron Cloud Charges Lost at Wall

08/08/27 10.48

Wall Polar Angle (θ)

Number of Electrons per Degree

ENTRIES 1099133 0.00 0.571E+06 0.00 0.00 0.529E+06 0.00 0.00 0.00 0.00

Azimuth (degrees) tan(θ) (1/3 for 1:3 RFA Port Holes)

0 500 1000

1500

2000

2500

3000

3500

4000

4500 x 10^5

0 10 20 30 40 50 60 70 80 90

0 50

100 150

200 250

300 350 0 0.2 0.4 0.6 0.8 1 0 25 50 75 100 125 150 175 200