Solenoid scan: 5.3 GeV 8 mA/bunch e- 15W TiN

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 2 4 6 8 10 12 14 16 18 20

Time (ns)

Button Signal (V)

11/19/12 Trace 1441 7.1 G

ECLOUD job 34933

11/19/12 Trace 1445 14.2 G

ECLOUD job 34934

11/19/12 Trace 1449 21.3 G

ECLOUD job 34935

11/19/12 Trace 1453 28.4 G

ECLOUD job 34936