Time (ns)

E_X at Center (V/m)

Time (ns)

E_Y at Center (V/m)

-1000

-800

-600

-400

-200 0 200 400 600

0 200 400

-600

-400

-200 0 200 400 600 800 1000

0 200 400

Time (ns) dE_X /dX at Center (kV/m^2)

Time (ns) dE_Y /dY at Center (kV/m^2)

-500 0 500 1000

1500

2000

2500

0 200 400 0

2000

4000

6000

8000

0 200 400