Time (ns)

E_X at Center (V/m)

Time (ns)

E_Y at Center (V/m)

-200

-150

-100 -50 0 50 100

0 50 100 150 200

-100 -50 0 50 100 150 200

0 50 100 150 200

Time (ns) dE_X /dX at Center (kV/m^2)

Time (ns) dE_Y /dY at Center (kV/m^2)

-25 0 25 50 75 100 125 150 175

0 50 100 150 200 -50 0 50 100 150 200 250

0 50 100 150 200