Q12-13W_p_dip: Cloud Density (e/m^3) Averaged Over 783.77 ns

-4 -3

-2 -1 0 1 2 3 4

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5 0 1000

2000

3000

4000

5000

6000

7000

8000

9000 x 10^9