bmad_12wig_2085_20081103/synch_power_positive_x_side_electron - Table Data

09/01/28 10.43

S(m)

Photon Rate (Photons/sec/meter)

B13W

Q12W

Q13W

SEX_12W

SEX_13W

S(m)

Power (W/m)

B13W

Q12W

Q13W

SEX_12W

SEX_13W

S(m)

Photon Rate/Power

B13W

Q12W

Q13W

SEX_12W

SEX_13W

0

2000

4000 x 10^{14}

77 78 79 80 81 82 83 84 85

0 2 4 6 8

77 78 79 80 81 82 83 84 85

3000

4000

5000

6000 x 10^{13}

77 78 79 80 81 82 83 84 85