ECLOUD-TS0407_p_driftpy: Electron Energies (eV) Averaged Over 293.71 ns

0

2

4

6

8

10

12

14

16

X (cm)

Y (cm)

-2.5

-2

-1.5

-1

-0.5

0

0.5

1

1.5

2

2.5

-4 -3 -2 -1 0 1 2 3 4