Job 51275: SEY Distributions for 0 Λ T Λ 60 ns

Entries Mean RMS 2484 35.41 16.78

17/01/02 10.09

Number of Electrons per eV

Energy Cut (eV)

Percentage above energy cut (%)

Total wall current density: 0 nA/cm^2 over 59.88 ns

1

10

10^2

10^3

1 10 10^2

0 10 20 30 40 50 60 70 80 90 100

1 10 10^2

Job 51275: SEY Distributions for 0 Λ T Λ 60 ns

17/01/02 10.09

Arrival Time (ns)

Arrival Energy (eV)

0 20 40 60 80 100 120

10 15 20 25 30 35 40 45 50 55 60

Job 51275: SEY Distributions for 0 Λ T Λ 60 ns

17/01/02 10.09

Secondary Charge/Lost Charge

Entries 2484

Incident Electron Energy (eV)

Lost Charge (e)

All SEY Components Reflected Electrons Rediffused Secondaries

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

20 40 60 80 100 120

0 10 20 30 40 50 60 70

20 40 60 80 100 120

Job 51275: SEY Distributions for 0 Λ T Λ 60 ns

Entries Mean RMS 2484 35.26 16.94

17/01/02 10.10

Incident Electron Energy (eV)

Entries Mean RMS 2484 26.71 16.14

Incident Polar Angle θ (degrees) (θ=0 for perpendicular)

Entries Mean RMS 2484 0.8893 0.2840

Secondary Yield

0

50

100

0 20 40 60 80 100 120

0 20 40 60 80

0 20 40 60 80 100

0 20 40 60 80

0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

Job 51275: SEY Distributions for 0 Λ T Λ 60 ns

Entries Mean RMS 2303 36.76 16.55

17/01/02 10.10

True Secondaries

Entries Mean RMS 2303 25.54 15.61

Entries Mean RMS 2303 0.9144 0.2777

Entries Mean RMS 181 16.18 7.978

Elastic Secondaries

Entries Mean RMS 181 41.53 15.50

Entries Mean RMS 181 0.5703 0.1253

Entries Mean RMS 0 0.000 0.000

Electron Energy (eV)

Rediffused Secondaries

Entries Mean RMS 0 0.000 0.000

Polar Angle (degrees)

Entries Mean RMS 0 0.000 0.000

Secondary Yield

0

50

100

0 50 100 0 20 40 60 80

0 50 100 0 20 40 60

0.5 1 1.5

0 5 10 15 20

0 50 100 0 2.5 5 7.5 10

0 50 100 0

10

20

30

0.5 1 1.5

-1 -0.5 0 0.5 1

0 50 100 -1 -0.5 0 0.5 1

0 50 100 -1 -0.5 0 0.5 1

0.5 1 1.5