Time (ns)

Electron Density (10^{12} m^{-3})

Time (ns)

Number of Macroparticles (10^3)

0 0.2 0.4 0.6 0.8 1

0 100 200 300 400 500

-200 0 200 400 600 800 1000

1200

0 100 200 300 400 500

Time (ns)

Electron Density (10^{12} m^{-3})

Time (ns)

Number of Macroparticles (10^3)

0.6 0.65 0.7 0.75 0.8 0.85 0.9 0.95

500 510 520 530 540 550 560 570

880 900 920 940 960 980 1000

1020

1040

500 510 520 530 540 550 560 570