Job 353: Electron Cloud Charges Lost at Wall

08/07/30 12.13

ENTRIES 100000

Macroparticle Energy (eV)

Secondary Charge/Lost Charge

0

0.25

0.5

0.75

1

1.25

1.5

1.75

2

2.25

100 200 300 400 500 600 700