Job 353: Electron Cloud Charges Lost at Wall

08/07/30 12.13

Lost Macroparticle Energy (eV)

Secondary Energy (eV)

0

10

20

30

40

50

60

70

0 10 20 30 40 50 60 70 80 90 100