Bunch current dependence: 5.3 GeV Positrons

11/03/06 11.42

-2.25

-2

-1.75

-1.5

-1.25

-1

-0.75

-0.5

-0.25

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 109 15W TiN 1 mA 9/21 Trace 115 15W TiN 2 mA 9/21 Trace 121 15W TiN 4 mA 9/21 Trace 127 15W TiN 6 mA 9/21 Trace 133 15W TiN 8 mA 9/21 Trace 139 15W TiN 10 mA

Bunch current dependence: 5.3 GeV Positrons

11/03/06 11.42

-1

-0.8

-0.6

-0.4

-0.2

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 109 15E Carbon2 1 mA 9/21 Trace 115 15E Carbon2 2 mA 9/21 Trace 121 15E Carbon2 4 mA 9/21 Trace 127 15E Carbon2 6 mA 9/21 Trace 133 15E Carbon2 8 mA 9/21 Trace 139 15E Carbon2 10 mA

Bunch current dependence: 5.3 GeV Electrons

11/03/06 11.42

-0.5

-0.4

-0.3

-0.2

-0.1

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 181 15W TiN 1 mA 9/21 Trace 187 15W TiN 2 mA 9/21 Trace 193 15W TiN 4 mA 9/21 Trace 199 15W TiN 6 mA 9/21 Trace 205 15W TiN 8 mA 9/21 Trace 211 15W TiN 10 mA

Bunch current dependence: 5.3 GeV Electrons

11/03/06 11.42

-0.5

-0.4

-0.3

-0.2

-0.1

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 181 15E Carbon2 1 mA 9/21 Trace 187 15E Carbon2 2 mA 9/21 Trace 193 15E Carbon2 4 mA 9/21 Trace 199 15E Carbon2 6 mA 9/21 Trace 205 15E Carbon2 8 mA 9/21 Trace 211 15E Carbon2 10 mA

Bunch current dependence: 5.3 GeV Positrons

11/03/06 11.42

-0.16

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 2 4 6 8 10 12 14 16 18 20

Time (ns)

Button Signal (V)

9/21 Trace 73 15W TiN 1 mA 9/21 Trace 79 15W TiN 2 mA 9/21 Trace 85 15W TiN 4 mA 9/21 Trace 91 15W TiN 6 mA 9/21 Trace 97 15W TiN 8 mA 9/21 Trace 103 15W TiN 10 mA

Bunch current dependence: 5.3 GeV Positrons

11/03/06 11.42

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 73 15E Carbon2 1 mA 9/21 Trace 79 15E Carbon2 2 mA 9/21 Trace 85 15E Carbon2 4 mA 9/21 Trace 91 15E Carbon2 6 mA 9/21 Trace 97 15E Carbon2 8 mA 9/21 Trace 103 15E Carbon2 10 mA

Bunch current dependence: 5.3 GeV Electrons

11/03/06 11.42

-0.02

-0.015

-0.01

-0.005

0

0.005

0.01

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 145 15W TiN 1 mA 9/21 Trace 151 15W TiN 2 mA 9/21 Trace 157 15W TiN 4 mA 9/21 Trace 163 15W TiN 6 mA 9/21 Trace 170 15W TiN 8 mA 9/21 Trace 177 15W TiN 10 mA

Bunch current dependence: 5.3 GeV Electrons

11/03/06 11.42

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002

0

0 5 10 15 20 25 30 35 40

Time (ns)

Button Signal (V)

9/21 Trace 145 15E Carbon2 1 mA 9/21 Trace 151 15E Carbon2 2 mA 9/21 Trace 157 15E Carbon2 4 mA 9/21 Trace 163 15E Carbon2 6 mA 9/21 Trace 170 15E Carbon2 8 mA 9/21 Trace 177 15E Carbon2 10 mA