Cloud Lifetime Study with δ_0 = 0.05

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 10 20 30 40 50 60 70 80 90

11/03/02 13.45

Time (ns)

Button Signal (V)