Vacuum chamber comparison: 5.3 GeV 3 mA/bunch Positrons

11/03/05 15.35

-0.225

-0.2

-0.175

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

5/17 Trace 88 15W Al

12/24 Trace 454 15W TiN

Vacuum chamber comparison: 5.3 GeV 5 mA/bunch Positrons

11/03/05 15.35

-0.2

-0.175

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

3/27 Trace 20 15W Carbon 1

12/24 Trace 457 15W TiN

Vacuum chamber comparison: 5.3 GeV 3 mA/bunch Positrons

11/03/05 15.35

-0.04

-0.03

-0.02

-0.01

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

5/17 Trace 169 15E Carbon 2

12/24 Trace 454 15E Carbon 2

Vacuum chamber comparison: 5.3 GeV 5 mA/bunch Positrons

11/03/05 15.35

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

3/27 Trace 20 15E TiN

12/24 Trace 457 15E Carbon 2

Vacuum chamber comparison: 5.3 GeV 3 mA/bunch Electrons

11/03/05 15.35

-0.4

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

5/17 Trace 187 15W Al

12/24 Trace 502 15W TiN

Vacuum chamber comparison: 5.3 GeV 5 mA/bunch Electrons

11/03/05 15.35

-0.2

-0.175

-0.15

-0.125

-0.1

-0.075

-0.05

-0.025

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

3/27 Trace 119 15W Carbon 1

12/24 Trace 505 15W TiN

Vacuum chamber comparison: 5.3 GeV 3 mA/bunch Electrons

11/03/05 15.35

-0.2

-0.15

-0.1

-0.05

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

5/17 Trace 367 15E Carbon 2

12/24 Trace 502 15E Carbon 2

Vacuum chamber comparison: 5.3 GeV 5 mA/bunch Electrons

11/03/05 15.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 10 20 30 40 50 60

Time (ns)

Button Signal (V)

3/27 Trace 119 15E TiN

12/24 Trace 505 15E Carbon 2