Job 18404: Shielded Button Simulation

-0.25

-0.2

-0.15

-0.1

-0.05 0

0 5 10 15 20 25 30 35 40

10/11/03 11.57

Button Signal (V)

-0.25

-0.2

-0.15

-0.1

-0.05 0

0 5 10 15 20 25 30 35 40 Time (ns)

Button Signal (V)

Job 18404: Shielded Button Simulation

-0.25

-0.2

-0.15

-0.1

-0.05 0

0 5 10 15 20 25 30 35 40

10/11/03 11.57

Time (ns)

Button Signal (V)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns

0 5 10 15 20 25 30 35

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 1175 3.450 0.8700

10/11/03 11.57

Arrival Energy (eV)

0 100 200 300 400 500

0 1000 2000 3000 4000 5000

Entries Mean RMS 1175 353.7 732.9

Production Energy (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns

0

5

10

15

2 2.5 3 3.5 4 4.5 5

Entries Mean RMS 435 3.507 0.8658

10/11/03 11.57

Arrival Energy for Button 1 (eV)

0 5 10 15 20

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 699 3.403 0.8597

Arrival Energy for Button 2(eV)

0

5

10

15

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 378 3.444 0.8874

Arrival Energy for Button 3 (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns

0 50 100 150 200

0 1000 2000 3000 4000 5000

Entries Mean RMS 435 288.0 671.8

10/11/03 11.57

Production Energy for Button 1 (eV)

0 100 200 300

0 1000 2000 3000 4000 5000

Entries Mean RMS 699 356.7 731.9

Production Energy for Button 2 (eV)

0 50 100 150

0 1000 2000 3000 4000 5000

Entries Mean RMS 378 394.7 738.9

Production Energy for Button 3 (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns

2

2.5

3

3.5

4

4.5

5

5.5

0 1000 2000 3000 4000 5000

10/11/03 11.57

Production Energy for Button 2 (eV)

Arrival Energy (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns: Primaries Only

0 5 10 15 20 25 30 35

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 1175 3.450 0.8700

10/11/03 11.57

Arrival Energy (eV)

0 100 200 300 400 500

0 1000 2000 3000 4000 5000

Entries Mean RMS 1175 353.7 732.9

Production Energy (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns: Primaries Only

0 2.5 5 7.5 10

2 2.5 3 3.5 4 4.5 5

Entries Mean RMS 209 3.497 0.8806

10/11/03 11.57

Arrival Energy for Button 1 (eV)

0 2.5 5 7.5 10

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 260 3.378 0.8846

Arrival Energy for Button 2(eV)

0 2 4 6

2 2.5 3 3.5 4 4.5 5 5.5

Entries Mean RMS 156 3.385 0.9181

Arrival Energy for Button 3 (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns: Primaries Only

0

50

100

150

-500 0 500 1000 1500 2000 2500 3000 3500 4000 4500

Entries Mean RMS 209 192.7 541.0

10/11/03 11.57

Production Energy for Button 1 (eV)

0 50 100 150

0 1000 2000 3000 4000 5000

Entries Mean RMS 260 210.0 557.0

Production Energy for Button 2 (eV)

0 20 40 60 80

0 1000 2000 3000 4000 5000

Entries Mean RMS 156 262.5 670.8

Production Energy for Button 3 (eV)

Job 18404: Button Signal Energies For 0 Λ T Λ 42 ns: Primaries Only

2

2.5

3

3.5

4

4.5

5

5.5

0 1000 2000 3000 4000 5000

10/11/03 11.57

Production Energy for Button 2 (eV)

Arrival Energy (eV)

Job 18404: Button Signal Macroparticles For 0 Λ T Λ 42 ns

0 250 500 750 1000

1250

1500

1750

2000

0 5 10 15 20 25 30 35 40

10/11/03 11.57

Number of Signal MPs

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0 5 10 15 20 25 30 35 40

Avg Signal MP Charge (1000 e)