Witness bunch study: 5.3 GeV 5.1 mA/bunch e+ 15W TiN

11/12/21 02.09

-0.4

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 20 40 60 80 100 120

Time (ns)

Button Signal (V)

ECLOUD job 24498

4/7 Trace 124 ECLOUD job 24499

4/7 Trace 136 ECLOUD job 24500

4/7 Trace 154 ECLOUD job 24501

4/7 Trace 190 ECLOUD job 24502

4/7 Trace 214 ECLOUD job 24503

4/7 Trace 239