QSPU in Q48W: 5.3 GeV e+ 8 mA/bunch Run 122

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

100 200 300 400 500 600 700 800 900 1000

Time (ns)

Collector Signal (V)

4/17/13 Detector 1

QSPU in Q48W: 5.3 GeV e+ 8 mA/bunch Run 122

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0.005

100 200 300 400 500 600 700 800 900 1000

Time (ns)

Collector Signal (V)

4/17/13 Detector 2