Job 221: Energy Distribution of Electrons Hitting Wall

Entries Mean RMS 501 75.20 145.1

08/05/05 13.55

Energy (eV)

Normalized Nr of Electrons

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1}

0 100 200 300 400 500 600 700