X (cm)

Job 219: QGRID Data

0.7130E+08/ 15 A0 -0.5457 A1 7.133

08/05/05 13.36

E_X (V/m)

Y (cm)

0.1457E+08/ 15 A0 -0.3218 A1 23.87

E_Y (V/m)

-30 -20 -10 0 10 20 30

-4 -3 -2 -1 0 1 2 3 4

-60 -40 -20 0 20 40 60

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5