x

Job 219: Electron Cloud Charges Lost at Wall

Entries Mean RMS 615 0.3426E-01 0.2543E-01

08/05/05 11.12

y

Entries Mean RMS 615 -0.2728E-03 0.8137E-02

z

Entries Mean RMS 615 -0.2553E-02 0.2712

0

100

200

-0.05 -0.04 -0.03 -0.02 -0.01 0 0.01 0.02 0.03 0.04 0.05

0 20 40 60 80

-0.02 -0.01 0 0.01 0.02 0.03

0 10 20 30 40

-0.6 -0.4 -0.2 0 0.2 0.4 0.6