Job 16441: Shielded Button Simulation

-0.15

-0.1

-0.05 0

0 2 4 6 8 10 12 14

10/07/07 10.16

Button Current (mA)

Button 1

-0.4

-0.2

0

0 2 4 6 8 10 12 14

Button Current (mA)

Button 2

-0.4

-0.3

-0.2

-0.1 0

0 2 4 6 8 10 12 14 Time (ns)

Button Current (mA)

Button 3

Job 16441: Button Signal Energies For 0 Λ T Λ 14 ns: Primaries Only

0 50 100 150 200

0 200 400 600 800 1000

Entries Mean RMS 4540 436.8 76.94

10/07/07 10.16

Production Energy for Button 1 (eV)

0 250 500 750 1000

-200 0 200 400 600 800 1000 1200 1400 1600

Entries Mean RMS 11193 333.4 87.67

Production Energy for Button 2 (eV)

0 250 500 750 1000

-200 0 200 400 600 800 1000 1200

Entries Mean RMS 9047 257.4 73.59

Production Energy for Button 3 (eV)

15E (Carbon) SPU Measurements (6/8/2010, 5.3 GeV, 1 mA bunch, 20 G)

10/07/07 10.17

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0 2 4 6 8 10 12 14

Electron Beam

Signal (Volts)