Conditioning comparison: 5.3 GeV e+ 15W a-C

12/03/07 10.46

-0.05

-0.04

-0.03

-0.02

-0.01

0

0 20 40 60 80 100 120

Time (ns)

Button Signal (V)

9/27/11 SR dose: 4.53Ξ10^{20}γ /m 11/28/11 SR dose: 6.23Ξ10^{24}γ /m 9/27/11 SR dose: 4.53Ξ10^{20}γ /m 11/28/11 SR dose: 6.23Ξ10^{24}γ /m