ECLOUD TS0109_SEY20_Epk310_nored: Secondary Electrons Generated at Wall

09/09/25 11.53

Secondary Charge/Lost Charge

Entries 52575

Macroparticle Energy (eV)

Lost Charge (e)

All SEY Components Reflected Electrons Rediffused Secondaries

0 0.5 1 1.5 2 2.5 3

10^{-3} 10^{-2} 10^{-1} 1 10 10^2

0 200 400 600 800 1000

1200 x 10^4

10^{-3} 10^{-2} 10^{-1} 1 10 10^2