Conditioning comparison: 5.3 GeV e+ 15W TiN

-0.4

-0.35

-0.3

-0.25

-0.2

-0.15

-0.1

-0.05

0

0 5 10 15 20 25 30 35 40 45 50

Time (ns)

Button Signal (V)

6/18/11 SR dose: 1.14Ξ10^{25}γ /m 8/22/12 SR dose: 1.39Ξ10^{20}γ /m 8/23/12 SR dose: 7.13Ξ10^{21}γ /m