SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

X(cm)

Y(cm)

Entries 3639

Origin S Position (m)

Entries Mean RMS 3548 51.46 73.66

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3623 6.058 3.756

Number of Reflections

-1.5 -1 -0.5 0 0.5 1 1.5

-1 0 1 0 100 200 300 400 500 600

2980 2990 3000 3010

0 100 200 300 400 500 600 700 800

0 200 400 0 100 200 300 400 500

0 10 20

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

Entries Mean RMS 3548 51.46 73.66

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3642 12.83 11.70

Angle of Incidence on Wall (degrees)

0 100 200 300 400 500 600 700 800

0 50 100 150 200 250 300 350 400 450 500

0 100 200 300 400 500 600 700

-20 0 20 40 60 80 100 120 140 160 180

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

X(cm)

Y(cm)

Entries 3642

Arrival S Position (m)

Azimuthal angle (degs) Origin S Position (m)

-1.5 -1 -0.5 0 0.5 1 1.5

-1 0 1 0 20 40 60 80 100 120 140 160

3015.2 3015.3 3015.4 3015.5 3015.6

0 50 100 150 200 250

0 100 200 300 400 0 100 200 300 400 500 600

2980 2990 3000 3010

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

Entries Mean RMS 3548 51.46 73.66

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3623 6.058 3.756

Number of Reflections

Number of Reflections

Arrival Energy (eV)

Entries Mean RMS 3627 1.095 0.8934

Difference Photon Track Length and ΔS (cm)

0 100 200 300 400 500 600 700 800

0 200 400 0 100 200 300 400 500

0 10 20

0 500 1000

1500

2000

2500

3000

0 5 10 15 20 0 50 100 150 200 250 300 350

0 2.5 5 7.5 10

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

Number of Reflections

Origin S Position (m)

-5 0 5 10 15 20 25

2950

2960

2970

2980

2990

3000

3010

3020 0

50

100

150

200

250

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

Entries Mean RMS 3642 12.83 11.70

Angle of Incidence on Wall (degrees)

Number of Reflections

Average Angle of Incidence (degrees)

0 100 200 300 400 500 600 700

-20 0 20 40 60 80 100 120 140 160 180

0 5 10 15 20 25 30 35

0 2 4 6 8 10 12 14 16 18 20

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP

Entries Mean RMS 3642 12.83 11.70

Angle of Incidence on Wall (degrees)

Origin S position (m)

Average Angle of Incidence (degrees)

0 100 200 300 400 500 600 700

-20 0 20 40 60 80 100 120 140 160 180

0

5

10

15

20

25

2975 2980 2985 2990 2995 3000 3005 3010 3015