SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

X(cm)

Y(cm)

Entries 3601

Origin S Position (m)

Entries Mean RMS 2828 125.9 129.7

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3601 0.2500E-01 0.2411E-09

Number of Reflections

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4

-1 -0.9 -0.8 -0.7 0 50 100 150 200 250

3010.4 3010.45 3010.5 3010.55

0 50 100 150 200 250

0 200 400 0 500 1000

1500

2000

2500

3000

3500

4000

-1 0 1

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

Entries Mean RMS 2828 125.9 129.7

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3601 0.1216 0.8530E-02

Angle of Incidence on Wall (degrees)

0 50 100 150 200 250

0 100 200 300 400 500

0 25 50 75 100 125 150 175 200

0.09 0.1 0.11 0.12 0.13 0.14 0.15 0.16

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

X(cm)

Y(cm)

Entries 3601

Arrival S Position (m)

Azimuthal angle (degs) Origin S Position (m)

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4

-1 -0.9 -0.8 -0.7 0 10 20 30 40 50 60 70 80 90

3015.2 3015.3 3015.4 3015.5 3015.6

0 50 100 150 200 250 300

160 180 200 220 0 50 100 150 200 250

3010.4 3010.45 3010.5 3010.55

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

Entries Mean RMS 2828 125.9 129.7

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 3601 0.2500E-01 0.2411E-09

Number of Reflections

Number of Reflections

Arrival Energy (eV)

Entries Mean RMS 3601 0.1072E-02 0.4777E-04

Difference Photon Track Length and ΔS (cm)

0 50 100 150 200 250

0 200 400 0 500 1000

1500

2000

2500

3000

3500

4000

-1 0 1

0 500 1000

1500

2000

2500

3000

3500

-1 0 1 0 500 1000

1500

2000

2500

0.09 0.1 0.11 0.12 x 10^{-2}

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

Number of Reflections

Origin S Position (m)

-1.5 -1 -0.5 0 0.5 1 1.5

3010.4

3010.42

3010.44

3010.46

3010.48

3010.5

3010.52

3010.54

3010.56 0 50 100 150 200 250 300 350 400 450

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

Entries Mean RMS 3601 0.1216 0.8530E-02

Angle of Incidence on Wall (degrees)

Number of Reflections

Average Angle of Incidence (degrees)

0 25 50 75 100 125 150 175 200

0.09 0.1 0.11 0.12 0.13 0.14 0.15 0.16

0 0.02

0.04

0.06

0.08 0.1 0.12

0 2 4 6 8 10 12 14 16 18 20

SYNRAD3D: SuperKEKB 4.0 GeV SLER_1689_nobump:QC1RP - No photon scattering

Entries Mean RMS 3601 0.1216 0.8530E-02

Angle of Incidence on Wall (degrees)

Origin S position (m)

Average Angle of Incidence (degrees)

0 25 50 75 100 125 150 175 200

0.09 0.1 0.11 0.12 0.13 0.14 0.15 0.16

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

3010.4 3010.42 3010.44 3010.46 3010.48 3010.5 3010.52 3010.54 3010.56