SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

X(cm)

Y(cm)

Entries 4505

Origin S Position (m)

Entries Mean RMS 2771 141.9 136.5

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 4505 0.2500E-01 0.2179E-09

Number of Reflections

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

4.74 4.75 4.76 4.77 4.78 0 50 100 150 200 250 300 350

373.65 373.7 373.75 373.8 373.85 373.9

0 25 50 75 100 125 150 175 200 225

0 200 400 0

1000

2000

3000

4000

5000

-1 0 1

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

Entries Mean RMS 2771 141.9 136.5

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 4505 0.6032 0.1129E-01

Angle of Incidence on Wall (degrees)

0 25 50 75 100 125 150 175 200 225

0 100 200 300 400 500

0 20 40 60 80 100 120 140 160 180

0.56 0.57 0.58 0.59 0.6 0.61 0.62 0.63 0.64 0.65

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

X(cm)

Y(cm)

Entries 4505

Arrival S Position (m)

Azimuthal angle (degs) Origin S Position (m)

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

4.74 4.75 4.76 4.77 4.78 0 20 40 60 80 100 120 140

378.9 379 379.1 379.2

0

500

1000

1500

2000

2500

0 100 200 300 400 0 50 100 150 200 250 300 350

373.65 373.7 373.75 373.8 373.85 373.9

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

Entries Mean RMS 2771 141.9 136.5

Arrival Energy (eV) (500 eV cutoff)

Entries Mean RMS 4505 0.2500E-01 0.2179E-09

Number of Reflections

Number of Reflections

Arrival Energy (eV)

Entries Mean RMS 4505 0.2652E-01 0.3844E-03

Difference Photon Track Length and ΔS (cm)

0 25 50 75 100 125 150 175 200 225

0 200 400 0

1000

2000

3000

4000

5000

-1 0 1

0 500 1000

1500

2000

2500

3000

3500

-1 0 1 0 50 100 150 200 250 300 350 400

0.26 0.265 0.27 x 10^{-1}

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

Number of Reflections

Origin S Position (m)

-1.5 -1 -0.5 0 0.5 1 1.5

373.65

373.675

373.7

373.725

373.75

373.775

373.8

373.825

373.85

373.875

373.9 0 100 200 300 400 500 600

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

Entries Mean RMS 4505 0.6032 0.1129E-01

Angle of Incidence on Wall (degrees)

Number of Reflections

Average Angle of Incidence (degrees)

0 20 40 60 80 100 120 140 160 180

0.56 0.57 0.58 0.59 0.6 0.61 0.62 0.63 0.64 0.65

0 0.1 0.2 0.3 0.4 0.5 0.6

0 2 4 6 8 10 12 14 16 18 20

SYNRAD3D: 5.3 GeV e+ beam. Q48W - no photon scattering

Entries Mean RMS 4505 0.6032 0.1129E-01

Angle of Incidence on Wall (degrees)

Origin S position (m)

Average Angle of Incidence (degrees)

0 20 40 60 80 100 120 140 160 180

0.56 0.57 0.58 0.59 0.6 0.61 0.62 0.63 0.64 0.65

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7

373.65 373.675 373.7 373.725 373.75 373.775 373.8 373.825 373.85 373.875 373.9