synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

0.051

0.052

0.053

0.054

0.055

0.056

0.057

0.058

0.059

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Photons/m/Beam Particle

QC1RP

1.525

1.55

1.575 1.6 1.625

1.65

1.675 1.7 1.725

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S (m)

Power (W/m) for 100 mA Beam Current

QC1RP

Drift Dipole Quadrupole Wiggler Other

synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

0.954

0.955

0.956

0.957

0.958

0.959

0.96

0.961

0.962

0.963

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Critical Energy (keV)

QC1RP

0.051

0.052

0.053

0.054

0.055

0.056

0.057

0.058

0.059

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S(m)

Photons/m/Beam Particle

QC1RP

Drift Dipole Quadrupole Wiggler Other

synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

20 30 40 50

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Beta X (m)

QC1RP

2600

2800

3000

3200

3400

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Beta Y (m)

QC1RP

-1

0

1

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S(m)

Eta X (m)

QC1RP

Drift Dipole Quadrupole Wiggler Other

synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

180 200 220 240 260 280 300 320 340

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Horizontal Beam Size (μm)

QC1RP

340 350 360 370 380 390 400

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S(m)

Vertical Beam Size (μm)

QC1RP

Drift Dipole Quadrupole Wiggler Other

synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

0.092

0.094

0.096

0.098 0.1 0.102

0.104

0.106

0.108 x 10^{-1}

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Surface Power Density (W/mm^2) for I_b = 1 A

QC1RP

15.25

15.5

15.75 16 16.25

16.5

16.75 17 17.25

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S (m)

Linear Power Density (W/m) for I_b = 1 A

QC1RP

Drift Dipole Quadrupole Wiggler Other

synrad_job221_negx_sler_1689_nobump^{14/10/08 11.13}

0.051

0.052

0.053

0.054

0.055

0.056

0.057

0.058

0.059

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55

Photons/m/Beam Particle

QC1RP

-2.5 -2 -1.5 -1 -0.5 0 0.5

3015.25 3015.3 3015.35 3015.4 3015.45 3015.5 3015.55 S (m)

Wall Position (cm)

QC1RP

Drift Dipole Quadrupole Wiggler Other