15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.04

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.04

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

-0.04

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.0 mA)

10/09/08 11.32

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.0 mA)

10/09/08 11.32

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15E (TiN) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.0 mA)

10/09/08 11.32

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

-0.03

-0.02

-0.01 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14 Button 2

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e+, 5.15 mA)

10/09/08 11.32

-0.02

-0.01

0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.02

-0.01

0

0 2 4 6 8 10 12 14 Button 2

Signal (Volts)

Time (ns)

-0.02

-0.01

0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.1 mA)

10/09/08 11.32

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.1 mA)

10/09/08 11.32

-0.016

-0.014

-0.012

-0.01

-0.008

-0.006

-0.004

-0.002 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)

15W (Carbon) SPU Measurements (3/27/2010, 5.3 GeV e-, 5.1 mA)

10/09/08 11.32

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 1

Signal (Volts)

Time (ns)

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 2

Signal (Volts)

Time (ns)

-0.015

-0.01

-0.005 0

0 2 4 6 8 10 12 14

Button 3

Signal (Volts)

Time (ns)