TS0608_SEY20_Epk310: Cloud Density (e/m^3) Averaged Over 643.6 ns

0 500 1000

1500

2000

2500

3000 x 10^9

X (cm)

Y (cm)

-2.5 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2 2.5

-4 -3 -2 -1 0 1 2 3 4