Beampipe-averaged Cloud Density (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.1

0.2

0.3

0.4

0.5

0.6

0 1000 2000 3000 4000 5000

Macroparticle Statistics

Time (ns)

Number of Macroparticles (10^3)

0

20

40

60

80

100

120

140

0 1000 2000 3000 4000 5000

Beam-averaged Cloud Density (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.02

0.04

0.06

0.08

0.1

0.12

0 1000 2000 3000 4000 5000

5-Sigma Cloud Density at Center of Pipe (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.05

0.1

0.15

0.2

0.25

0.3

0.35

0.4

0 1000 2000 3000 4000 5000

Job 14306: Cloud Density in Central Grid Cell (10^{12} m^{-3})

Time (ns)

Electron Density (10^{12} m^{-3})

0

0.02

0.04

0.06

0.08

0.1

0.12

0.14

0 1000 2000 3000 4000 5000