QSPU in Q48W: 5.3 GeV e+ 20 bunches

-0.06

-0.05

-0.04

-0.03

-0.02

-0.01

0

0 50 100 150 200 250 300 350 400

Time (ns)

Collector Signal (V)

4/5/14 Trace 114 4.01 mA/bunch

ECLOUD job 37691

4/5/14 Trace 132 6.26 mA/bunch

ECLOUD job 37692

4/5/14 Trace 140 7.26 mA/bunch

ECLOUD job 37693

4/5/14 Trace 148 8.26 mA/bunch

ECLOUD job 37694