Cloud Lifetime Study with δ_0 = 0.55

-0.8

-0.7

-0.6

-0.5

-0.4

-0.3

-0.2

-0.1

0

0 20 40 60 80 100 120

11/01/13 14.24

Time (ns)

Button Signal (V)

δ_0 = 0.55