SEMAX Comparison: 5.3 GeV 5.1 mA/bunch e+ 15W TiN

11/09/02 10.53

-0.04

-0.035

-0.03

-0.025

-0.02

-0.015

-0.01

-0.005

0

0 10 20 30 40 50 60 70

Time (ns)

Button Signal (V)

E_{SEY} = 1 eV