synrad_job126_negx^{10/07/15 15.57}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Power (W/m) for 100 mA Beam Current

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job126_negx^{10/07/15 15.57}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

S(m)

Drift Dipole Wiggler Other

synrad_job126_negx^{10/07/15 15.57}

4

4.5

5

666 666.5 667 667.5 668 668.5 669

Beta X (m)

Q15E

SP15E3 SP15E2

35 37.5 40 42.5 45

666 666.5 667 667.5 668 668.5 669

Beta Y (m)

Q15E

SP15E3 SP15E2

1.16

1.18 1.2 1.22

1.24

666 666.5 667 667.5 668 668.5 669

S(m)

Eta X (m)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job126_negx^{10/07/15 15.57}

1060

1080

1100

1120

1140

1160

1180

1200

666 666.5 667 667.5 668 668.5 669

Horizontal Beam Size (μm)

Q15E

SP15E3 SP15E2

305 310 315 320 325 330 335 340 345 350

666 666.5 667 667.5 668 668.5 669

S(m)

Vertical Beam Size (μm)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job126_negx^{10/07/15 15.57}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Surface Power Density (W/mm^2)

Q15E

SP15E3 SP15E2

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Linear Power Density (W/m)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job126_negx^{10/07/15 15.57}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

-10

-8

-6

-4

-2

0

666 666.5 667 667.5 668 668.5 669

S (cm)

Wall Position (cm)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other