synrad_job126_posx^{10/07/15 12.05}

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

0.24

675 675.5 676 676.5 677 677.5 678

Photons/m/Beam Particle

B15E

Q14E

DET_15E

10 15 20 25 30 35 40

675 675.5 676 676.5 677 677.5 678

Power (W/m) for 100 mA Beam Current

B15E

Q14E

DET_15E

Drift Dipole Wiggler Other

synrad_job126_posx^{10/07/15 12.05}

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

0.24

675 675.5 676 676.5 677 677.5 678

Photons/m/Beam Particle

B15E

Q14E

DET_15E

5.605

5.6055

5.606

5.6065

5.607

5.6075

5.608

5.6085

5.609

675 675.5 676 676.5 677 677.5 678

Critical Energy (keV)

B15E

Q14E

DET_15E

S(m)

Drift Dipole Wiggler Other

synrad_job126_posx^{10/07/15 12.05}

18

20

22

24

675 675.5 676 676.5 677 677.5 678

Beta X (m)

B15E

Q14E

DET_15E

11

12

13

14

675 675.5 676 676.5 677 677.5 678

Beta Y (m)

B15E

Q14E

DET_15E

1.6 1.65 1.7 1.75 1.8 1.85

675 675.5 676 676.5 677 677.5 678 S(m)

Eta X (m)

B15E

Q14E

DET_15E

Drift Dipole Wiggler Other

synrad_job126_posx^{10/07/15 12.05}

1900

1950

2000

2050

2100

2150

2200

675 675.5 676 676.5 677 677.5 678

Horizontal Beam Size (μm)

B15E

Q14E

DET_15E

170 175 180 185 190 195 200

675 675.5 676 676.5 677 677.5 678 S(m)

Vertical Beam Size (μm)

B15E

Q14E

DET_15E

Drift Dipole Wiggler Other

synrad_job126_posx^{10/07/15 12.05}

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

675 675.5 676 676.5 677 677.5 678

Surface Power Density (W/mm^2)

B15E

Q14E

DET_15E

10 15 20 25 30 35 40

675 675.5 676 676.5 677 677.5 678

Linear Power Density (W/m)

B15E

Q14E

DET_15E

Drift Dipole Wiggler Other

synrad_job126_posx^{10/07/15 12.05}

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

0.24

675 675.5 676 676.5 677 677.5 678

Photons/m/Beam Particle

B15E

Q14E

DET_15E

0

2

4

6

8

10

675 675.5 676 676.5 677 677.5 678 S (cm)

Wall Position (cm)

B15E

Q14E

DET_15E

Drift Dipole Wiggler Other