synrad_job127_posx^{10/07/15 15.58}

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

30 40 50 60 70 80 90 100 110 120 130

666 666.5 667 667.5 668 668.5 669

Power (W/m) for 100 mA Beam Current

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job127_posx^{10/07/15 15.58}

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

3.7365

3.737

3.7375

3.738

3.7385

3.739

3.7395

3.74

666 666.5 667 667.5 668 668.5 669

Critical Energy (keV)

Q15E

SP15E3 SP15E2

S(m)

Drift Dipole Wiggler Other

synrad_job127_posx^{10/07/15 15.58}

5.5

6

6.5

666 666.5 667 667.5 668 668.5 669

Beta X (m)

Q15E

SP15E3 SP15E2

32 34 36 38 40

666 666.5 667 667.5 668 668.5 669

Beta Y (m)

Q15E

SP15E3 SP15E2

1.3 1.32

1.34

1.36

1.38

666 666.5 667 667.5 668 668.5 669

S(m)

Eta X (m)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job127_posx^{10/07/15 15.58}

1210

1220

1230

1240

1250

1260

1270

1280

1290

1300

1310

666 666.5 667 667.5 668 668.5 669

Horizontal Beam Size (μm)

Q15E

SP15E3 SP15E2

290 295 300 305 310 315 320 325 330

666 666.5 667 667.5 668 668.5 669

S(m)

Vertical Beam Size (μm)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job127_posx^{10/07/15 15.58}

0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18

666 666.5 667 667.5 668 668.5 669

Surface Power Density (W/mm^2)

Q15E

SP15E3 SP15E2

30 40 50 60 70 80 90 100 110 120 130

666 666.5 667 667.5 668 668.5 669

Linear Power Density (W/m)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other

synrad_job127_posx^{10/07/15 15.58}

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 1.1

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E3 SP15E2

0

2

4

6

8

10

666 666.5 667 667.5 668 668.5 669

S (cm)

Wall Position (cm)

Q15E

SP15E3 SP15E2

Drift Dipole Wiggler Other