synrad_job129_negx^{10/06/13 18.35}

-1.5 -1 -0.5 0 0.5 1 1.5

675 675.5 676 676.5 677 677.5 678

Photons/m/Beam Particle

B15E

DET_15E

-1.5 -1 -0.5 0 0.5 1 1.5

675 675.5 676 676.5 677 677.5 678

Power (W/m) for 100 mA Beam Current

B15E

DET_15E

S(m)

Drift Dipole Wiggler Other

synrad_job129_negx^{10/06/13 18.35}

24 26 28 30 32

675 675.5 676 676.5 677 677.5 678

Beta X (m)

B15E

DET_15E

4 4.5 5 5.5 6 6.5

675 675.5 676 676.5 677 677.5 678

Beta Y (m)

B15E

DET_15E

1.9

2

2.1

2.2

675 675.5 676 676.5 677 677.5 678 S(m)

Eta X (m)

B15E

DET_15E

Drift Dipole Wiggler Other

synrad_job129_negx^{10/06/13 18.35}

1550

1600

1650

1700

1750

1800

1850

675 675.5 676 676.5 677 677.5 678

Horizontal Beam Size (μm)

B15E

DET_15E

14 14.5 15 15.5 16 16.5 17 17.5 18

675 675.5 676 676.5 677 677.5 678 S(m)

Vertical Beam Size (μm)

B15E

DET_15E

Drift Dipole Wiggler Other

synrad_job129_negx^{10/06/13 18.35}

-1.5 -1 -0.5 0 0.5 1 1.5

675 675.5 676 676.5 677 677.5 678

Surface Power Density (W/mm^2)

B15E

DET_15E

-1.5 -1 -0.5 0 0.5 1 1.5

675 675.5 676 676.5 677 677.5 678

Linear Power Density (W/m)

B15E

DET_15E

Drift Dipole Wiggler Other

synrad_job129_negx^{10/06/13 18.35}

-1.5 -1 -0.5 0 0.5 1 1.5

675 675.5 676 676.5 677 677.5 678

Photons/m/Beam Particle

B15E

DET_15E

-10

-8

-6

-4

-2

0

675 675.5 676 676.5 677 677.5 678 S (cm)

Wall Position (cm)

B15E

DET_15E

Drift Dipole Wiggler Other