synrad_job128_negx^{10/06/13 19.15}

-1.5 -1 -0.5 0 0.5 1 1.5

100 100.5 101 101.5 102 102.5 103

Photons/m/Beam Particle

Q15W

SP15W2

DE_T15W

-1.5 -1 -0.5 0 0.5 1 1.5

100 100.5 101 101.5 102 102.5 103

Power (W/m) for 100 mA Beam Current

Q15W

SP15W2

DE_T15W

S(m)

Drift Dipole Wiggler Other

synrad_job128_negx^{10/06/13 19.15}

3

4

5

100 100.5 101 101.5 102 102.5 103

Beta X (m)

Q15W

SP15W2

DE_T15W

30 32.5 35 37.5 40

100 100.5 101 101.5 102 102.5 103

Beta Y (m)

Q15W

SP15W2

DE_T15W

0.95

1 1.05 1.1

100 100.5 101 101.5 102 102.5 103 S(m)

Eta X (m)

Q15W

SP15W2

DE_T15W

Drift Dipole Wiggler Other

synrad_job128_negx^{10/06/13 19.15}

760 780 800 820 840 860 880 900

100 100.5 101 101.5 102 102.5 103

Horizontal Beam Size (μm)

Q15W

SP15W2

DE_T15W

40 41 42 43 44 45 46 47

100 100.5 101 101.5 102 102.5 103 S(m)

Vertical Beam Size (μm)

Q15W

SP15W2

DE_T15W

Drift Dipole Wiggler Other

synrad_job128_negx^{10/06/13 19.15}

-1.5 -1 -0.5 0 0.5 1 1.5

100 100.5 101 101.5 102 102.5 103

Surface Power Density (W/mm^2)

Q15W

SP15W2

DE_T15W

-1.5 -1 -0.5 0 0.5 1 1.5

100 100.5 101 101.5 102 102.5 103

Linear Power Density (W/m)

Q15W

SP15W2

DE_T15W

Drift Dipole Wiggler Other

synrad_job128_negx^{10/06/13 19.15}

-1.5 -1 -0.5 0 0.5 1 1.5

100 100.5 101 101.5 102 102.5 103

Photons/m/Beam Particle

Q15W

SP15W2

DE_T15W

-10

-8

-6

-4

-2

0

100 100.5 101 101.5 102 102.5 103 S (cm)

Wall Position (cm)

Q15W

SP15W2

DE_T15W

Drift Dipole Wiggler Other