synrad_job128_posx^{10/06/13 19.03}

0 2.5 5 7.5 10 12.5 15 17.5 20

0 100 200 300 400 500 600 700

Photons/m/Beam Particle

0 2500

5000

7500

10000

12500

15000

17500

20000

0 100 200 300 400 500 600 700

Power (W/m) for 100 mA Beam Current

S(m)

Drift Dipole Wiggler Other

synrad_job128_posx^{10/06/13 19.04}

0 10 20 30 40 50

0 100 200 300 400 500 600 700

Beta X (m)

0 10 20 30 40 50

0 100 200 300 400 500 600 700

Beta Y (m)

0

1

2

3

0 100 200 300 400 500 600 700 S(m)

Eta X (m)

Drift Dipole Wiggler Other

synrad_job128_posx^{10/06/13 19.05}

0 250 500 750 1000

1250

1500

1750

2000

0 100 200 300 400 500 600 700

Horizontal Beam Size (μm)

10 15 20 25 30 35 40 45 50 55

0 100 200 300 400 500 600 700 S(m)

Vertical Beam Size (μm)

Drift Dipole Wiggler Other

synrad_job128_posx^{10/06/13 19.06}

-0.5 0 0.5 1 1.5 2 2.5

0 100 200 300 400 500 600 700

Surface Power Density (W/mm^2)

0 2500

5000

7500

10000

12500

15000

17500

20000

0 100 200 300 400 500 600 700

Linear Power Density (W/m)

Drift Dipole Wiggler Other

synrad_job128_posx^{10/06/13 19.07}

0 2.5 5 7.5 10 12.5 15 17.5 20

0 100 200 300 400 500 600 700

Photons/m/Beam Particle

2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 100 200 300 400 500 600 700 S (cm)

Wall Position (cm)

Drift Dipole Wiggler Other