synrad_job124_negx^{10/06/13 18.47}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E2

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Power (W/m) for 100 mA Beam Current

Q15E

SP15E2

S(m)

Drift Dipole Wiggler Other

synrad_job124_negx^{10/06/13 18.47}

3

4

5

666 666.5 667 667.5 668 668.5 669

Beta X (m)

Q15E

SP15E2

24 26 28 30 32

666 666.5 667 667.5 668 668.5 669

Beta Y (m)

Q15E

SP15E2

0.55 0.6 0.65 0.7 0.75 0.8

666 666.5 667 667.5 668 668.5 669 S(m)

Eta X (m)

Q15E

SP15E2

Drift Dipole Wiggler Other

synrad_job124_negx^{10/06/13 18.47}

550 575 600 625 650 675 700 725 750 775 800

666 666.5 667 667.5 668 668.5 669

Horizontal Beam Size (μm)

Q15E

SP15E2

104 106 108 110 112 114 116 118 120 122 124

666 666.5 667 667.5 668 668.5 669 S(m)

Vertical Beam Size (μm)

Q15E

SP15E2

Drift Dipole Wiggler Other

synrad_job124_negx^{10/06/13 18.47}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Surface Power Density (W/mm^2)

Q15E

SP15E2

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Linear Power Density (W/m)

Q15E

SP15E2

Drift Dipole Wiggler Other

synrad_job124_negx^{10/06/13 18.47}

-1.5 -1 -0.5 0 0.5 1 1.5

666 666.5 667 667.5 668 668.5 669

Photons/m/Beam Particle

Q15E

SP15E2

-10

-8

-6

-4

-2

0

666 666.5 667 667.5 668 668.5 669 S (cm)

Wall Position (cm)

Q15E

SP15E2

Drift Dipole Wiggler Other