DR20110311_32: Coherent Tune Shifts

Time (ns) Time (ns)

Solenoid Dipole Solenoid + Dipole

ΔQ_X (kHz) ΔQ_Y (kHz)

0 0.01

0.02

0.03

0.04

0.05

0 500 1000 1500 0 0.01

0.02

0.03

0.04

0.05

0 500 1000 1500