dsb3_2_elemen: Dipole and Quadrupole Fields

11/03/24 10.50

Dipole Field (T)

S (m)

Field Gradient (T/m)

0.26

0.28 0.3 0.32

0.34

0.36

0.38 0.4

0 500 1000 1500 2000 2500 3000

-15 -10 -5 0 5 10 15 20

0 500 1000 1500 2000 2500 3000

dsb3_2_elemen: Dipole and Quadrupole Fields

Entries 120

11/03/24 10.50

Dipole Field (T)

Number of Dipoles

Entries 534

Field Gradient (T/m)

Number of Quadrupoles

0 10 20 30 40 50 60 70

0.26 0.28 0.3 0.32 0.34 0.36 0.38 0.4

0 20 40 60 80 100 120

0 2 4 6 8 10 12 14 16