Job 620

Turn Number

Average Max HOM Amplitude (V)

Turn Number

Turn-to-turn Power Gain Factor

1.414211

1.414212

1.4142129

1.4142139

1.4142148

1.4142158

1.4142168

1.4142177

1.4142187

3 4 5 6 7 8 9 10 11

-0.5 0 0.5 1 1.5 2 2.5

3 4 5 6 7 8 9 10 11

Job 620

Cavity Number

Orbit X Average (mm)

Cavity Number

Orbit X RMS (mm)

0 0.02

0.04

0.06

0.08 0.1 0.12 x 10^{-4}

0 1 2 3 4 5 6 7

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14 x 10^{-6}

0 1 2 3 4 5 6 7

Job 620

Cavity Number

Orbit X Minimum (mm)

Cavity Number

Orbit X Maximum (mm)

0 0.02

0.04

0.06

0.08 0.1 0.12 x 10^{-4}

0 1 2 3 4 5 6 7

0 0.02

0.04

0.06

0.08 0.1 0.12 x 10^{-4}

0 1 2 3 4 5 6 7

Job 620

Cavity Number

Relative Energy Offset Average (%)

Cavity Number

Relative Energy Offset RMS (%)

0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 x 10^{-3}

0 1 2 3 4 5 6 7

0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

0 1 2 3 4 5 6 7

Job 620

Cavity Number

Relative Energy Offset Minimum (%)

Cavity Number

Relative Energy Offset Maximum (%)

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02 0

0 1 2 3 4 5 6 7

0.02

0.04

0.06

0.08 0.1 0.12

0.14

0 1 2 3 4 5 6 7

Job 620

Cavity Number

Z Offset Average (m)

Cavity Number

Z Offset RMS (m)

-0.14

-0.12

-0.1

-0.08

-0.06

-0.04

-0.02 0 x 10^{-12}

0 1 2 3 4 5 6 7

-0.02 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14 x 10^{-2}

0 1 2 3 4 5 6 7

Job 620

Cavity Number

Z Offset Minimum (m)

Cavity Number

Z Offset Maximum (m)

-0.173

-0.1725

-0.172

-0.1715

-0.171

-0.1705

-0.17

-0.1695

-0.169 x 10^{-2}

0 1 2 3 4 5 6 7

0.17

0.171

0.172

0.173

0.174

0.175

0.176

0.177 x 10^{-2}

0 1 2 3 4 5 6 7

Job 620

HOM Frequency (GHz)

Orbit X Average (mm)

HOM Frequency (GHz)

Orbit X RMS (mm)

0 0.02

0.04

0.06

0.08 0.1 0.12 x 10^{-7}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14 x 10^{-9}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

Job 620: Max HOM Voltages (V)

Cavity Number

Max HOM Voltage (V)

HOM Frequency (GHz)

Max HOM Voltage (V)

-0.5 0 0.5 1 1.5 2 2.5 3

0 1 2 3 4 5 6 7

-0.5 0 0.5 1 1.5 2 2.5 3

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

HOM frequency (Hz), R/Q (Ohms/m^2) and Q

HOM Frequency (Hz) R/Q (Ohms/m^2)

Cavity Number

HOM Q Value

0 1000

2000

3000 x 10^6

0 2 4 6 8 10 12 14

0 50 100 150

0 2 4 6 8 10 12 14

0 1000

2000

3000

4000 x 10^5

0 1 2 3 4 5 6 7

Job 620: Max HOM Power (W)

Cavity Number

Max HOM Power (W)

HOM Frequency (GHz)

Max HOM Power (W)

-0.02 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 x 10^{-6}

0 1 2 3 4 5 6 7

-0.02 0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 x 10^{-6}

-0.5 0 0.5 1 1.5 2 2.5 3 3.5