Job 195

Entries Mean RMS 34 1099. 192.3

Threshold Current (mA)

Critical Cavity S Position (m)

0 1 2 3 4 5 6

0 200 400 600 800 1000 1200 1400

0 1 2 3 4 5

765 767.5 770 772.5 775 777.5 780 782.5 785 787.5 790