Job 197

Entries Mean RMS 85 2418. 307.0

Threshold Current (mA)

Critical Cavity S Position (m)

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

0 500 1000 1500 2000 2500 3000

0 10 20 30 40 50

755 760 765 770 775 780 785 790