Job 247

Turn Number

Sum over Cavities of Max HOM Power

Turn Number

Turn-to-turn Power Gain Factor

-200 0 200 400 600 800 1000

1200

1400 x 10^3

2 4 6 8 10 12 14 16 18 20 22

-0.002 0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

2 4 6 8 10 12 14 16 18 20 22

Job 247

Cavity Number (First turn: 1-384, Second turn: 385-768)

Orbit X Average (mm)

Cavity Number (First turn: 1-384, Second turn: 385-768)

Orbit X RMS (mm)

-10 -5 0 5 10 15 20

0 100 200 300 400 500 600 700 800

-0.05 0 0.05 0.1 0.15 0.2 0.25 x 10^{-5}

0 100 200 300 400 500 600 700 800

Job 247

Cavity Number (First turn: 1-384, Second turn: 385-768)

Orbit X Minimum (mm)

Cavity Number (First turn: 1-384, Second turn: 385-768)

Orbit X Maximum (mm)

-10 -5 0 5 10 15 20

0 100 200 300 400 500 600 700 800

-10 -5 0 5 10 15 20

0 100 200 300 400 500 600 700 800