Job 638

Entries Mean RMS 50 310.5 8.248

Threshold Current (mA)

Number of Seeds

Critical Cavity S Position (m)

0 1 2 3 4 5

290 295 300 305 310 315 320 325 330 335 340

0 10 20 30 40 50

-100 0 100 200 300 400 500 600 700